[cm] ϕΔr -0.04 -0.02 0 0.02 0.04 number of events

0

200

400

600

mμ 0.4 ± Sigma 29.4 mμ 0.4 ± Mean 3.7 w/o survey with survey

SSD layer5-to-layer6 residuals